FC connector at the end of each 1st fiber.

A 2nd fiber bundle mounted on TOF panel.

1st fiber2nd fiber bundle2nd fiber bundle2nd fiber bundle has 37 fibers.It delivers the beam to 32 TOF slats.Special small connector at the end of 2nd fiber. Special holder attached to TOF slat.

connection

2nd bundle�s jacket is adjustable for distance between 1st and 2nd bundle.

jacket