1

10

10^2

10^3

Time of Flight [ns]

10 15 20 25 30 35 40 45 50 55 60

]^{-1} charge/Momentum [(GeV/c)

-6 -4 -2 0 2 4 6 PHENIX High Resolution TOF = 200 A GeV s Au+Au +π

−π

+K

K^− p

p d d