Q^2 [GeV^2]

eRHIC Ρs = 141 GeV, 0.01 ≤ y ≤ 0.95 eRHIC Ρs = 77 GeV, 0.01 ≤ y ≤ 0.95

current polarized DIS data:

CERN DESY JLab-6 SLAC

current polarized BNL-RHIC pp data:

PHENIX π^0 STAR 1-jet W bosons starting up: JLab-12

projected CC DIS data:

eRHIC Ρs = 141 GeV

1

10

10^2

10^3

10^4

10^{-4} 10^{-3} 10^{-2} 10^{-1} 1