0

0.2

0.4

0.6

10^{-6} 10^{-5} 10^{-4} 10^{-3} 10^{-2} 10^{-1} 1

DSSV 2014

with 90% C.L. band

eRHIC data: 15 Ξ 100 GeV + 15 Ξ 250 GeV + 20 Ξ 250 GeV all bands 90% C.L.

Ι dx ΔΣ(x,Q^2)

x_{min} 1

x_{min}

Q^2 = 10 GeV^2