Fx -1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1 wrt e-scatt. plane) 1 > (v ϕ B/A=2<cos

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 15x100 ep 2 >1.0 GeV 2 Chgd. hadrons Q

= 1.3 GeV EIC det. acceptance Tk = 0.88 GeV EIC det. acceptance Tk = 0.44 GeV EIC det. acceptance Tk

2 2