proton momentum [GeV/c]

0 50 100 150 200 250

proton scattering angle [mrad]

0 5 10 15 20 25 30

1

10

210

310

410 15 GeV on 50 GeV

15 GeV on 100 GeV

15 GeV on 250 GeV