Golden Fill (May 14 Owl) - #3713

• ZDCN=RC .AND. ZDC YELLOW (due to mistake) • Time in Fill is shown with COLOR ...

BLACK, RED, GREEN, BLUE, YELLOW • 1st run in fill - no background issues (not typical) • Panel Left/Top - clear trend with vertex width?

Sample Fill (May 17th Day) - #3732

• ZDCN=RC .AND. ZDC YELLOW (due to mistake) • Time in Fill is shown with COLOR ...

BLACK, RED, GREEN, BLUE, YELLOW, MAGENTA • 1st run in fill - background issues (not atypical) • Panel Left/Top - trend with vertex width?

Relative Luminosity Error -vs- Time

• For A_N ∼1%, need ΔR/R<0.3×10^{−2} since ⃗p_b∼30%. • See changes w/in fill, e.g., INRL/BBC at Run ∼8960. • Measurement w/ZDC limited by statistics. • BBC & INRL look good, ΔR/R<0.3%.

• Bunch-by-bunch correction for vertex widths ...

improve? ... match FS acceptance? ... to do!